--
-- Structure de la table `logsCount`
--

CREATE TABLE IF NOT EXISTS `logsCount` (
  `jour` date NOT NULL,
  `idClient` int(11) NOT NULL,
  `service` char(20) NOT NULL,
  `login` char(20) NOT NULL,
  `log` char(20) NOT NULL,
  `conso` int(11) NOT NULL,
  `batchUpdate` datetime NOT NULL DEFAULT '0000-00-00 00:00:00'
) ENGINE=MyISAM;
